From 9273cbb786c1adcf43e0dcb993b769515e9dba30 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Bartek=20Iwa=C5=84czuk?= <biwanczuk@gmail.com>
Date: Sat, 24 Jun 2023 10:36:15 +0200
Subject: bench: fix benchmarks (#19600)

---
 cli/bench/http/deno_reactdom_ssr_flash.jsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'cli/bench/http/deno_reactdom_ssr_flash.jsx')

diff --git a/cli/bench/http/deno_reactdom_ssr_flash.jsx b/cli/bench/http/deno_reactdom_ssr_flash.jsx
index 42c955624..c23748832 100644
--- a/cli/bench/http/deno_reactdom_ssr_flash.jsx
+++ b/cli/bench/http/deno_reactdom_ssr_flash.jsx
@@ -18,6 +18,6 @@ const headers = {
   },
 };
 
-serve({ hostname, port }, async () => {
+serve({ hostname, port: Number(port) }, async () => {
   return new Response(await renderToReadableStream(<App />), headers);
 });
-- 
cgit v1.2.3

